
diff -r 0c2ef191b22a -r d48f53715f77 absyntax/absyntax.def
--- a/absyntax/absyntax.def	Wed Feb 01 13:01:08 2012 +0000
+++ b/absyntax/absyntax.def	Wed Feb 01 19:49:11 2012 +0000
@@ -1047,12 +1047,12 @@
 /* nonformal_param_list -> may be NULL ! */
 /* NOTE: The parameter 'called_function_declaration' is used to pass data between the stage 3 and stage 4.
  *       The IEC 61131-3 standard allows for overloaded standard functions. This means that some
- *       function calls are not compeletely defined by the name of the function being called,
+ *       function calls are not completely defined by the name of the function being called,
  *       and need to be disambiguated with using the data types of the parameters being passed.
- *       Stage 3 does this to verify semantic correctnes.
+ *       Stage 3 does this to verify semantic correctness.
  *       Stage 4 also needs to do this in order to determine which function to call.
  *       It does not make sense to determine the exact function being called twice (once in stage 3,
- *       and again in stage 4), so stage 3 will store this infor in the parameter called_function_declaration
+ *       and again in stage 4), so stage 3 will store this info in the parameter called_function_declaration
  *       for stage 4 to use it later on.
  */
 SYM_REF3(function_invocation_c, function_name, formal_param_list, nonformal_param_list, symbol_c *called_function_declaration; int extensible_param_count;)




